102 105108 111

114 114

114

117 117

117

120

120

123

123

126 129 132 135

147

147

147

150 150

150

150

150 150

153

153

153

153

153

156

156

H 158

H 157

H 156

L 99

L 144

L 145

220807/1800V000 850 MB WIND (KTS), AND HEIGHT

-60

-50

-40

-30

-20

-10

0

10

-110 -100 -90 -80 -70 -60 -50 -40 -30 -20 -10 H

H 7 H 6

L 0 L 0 L 0

0

0

H 28 H 27

H 26

L -15

L -14 L -10

-2

-2

2

2

H H

H

L

L L

220807/1800 850 MB BRBK:1.5:2:112 TMPC DWPC