255

258

258

261

261

264

264

267 267

270 273 276 279 282 285 288

306

306

312

315

315 315

315 315

318

H 318 H 318 H 318

L 253

L 305

L

220808/0000V000 700 MB WIND (KTS), AND HEIGHT

-60

-50

-40

-30

-20

-10

0

10

-110 -100 -90 -80 -70 -60 -50 -40 -30 -20 -10 H

H 7 H 7

L 0

L 0

L 0 H 13

H 12 H 12

L

L -20

L -19

2

H

H H

L

L L

10 4 9 6

9 5 7 3 10 0 9 7 8 2 6 1 7 7 7 -32

-8 -20

-11 -40

220808/0000 700 MB BRBK:1.5:2:112 TMPC DWPC